The Economy of Roman Palestine
edition published: 2023-06-28-04:00
availability: The full data set is released for reuse under a Creative Commons Attribution 4.0 Unported License. Individual bibliographic entries are factual data considered to be in the public domain in the United States of America and many other jurisdictions. (http://creativecommons.org/licenses/by/4.0/)

Ze'Ev Safrai Nfa, The Economy of Roman Palestine, https://caesarea-maritima.org/bibl/AENCYZZI, https://www.zotero.org/groups/caesarea-maritima/items/AENCYZZI, https://www.zotero.org/groups/2320447/items/AENCYZZI, London, New York, Routledge, 1994

Nfa, Ze’Ev Safrai. The Economy of Roman Palestine. London, New York: Routledge, 1994.

[...]

Ze’Ev Safrai Nfa, The Economy of Roman Palestine (London, New York: Routledge, 1994).